Quintiq file version 2.0
#parent: Toolbar/btnOk
Response OnClick () id:Response_Toolbar_btnOk_OnClick
{
  #keys: '[11660.1.183165125]'
  Body:
  [*
    Dialog.SetAttributesBeforeOnApplyData();
    Dialog.ApplyChanges();
    Dialog.EndModal(1);
  *]
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    sanitycheckfeedback := '';
    return SalesDemandBase::ValidateInput( feedback,
                                       sanitycheckfeedback,
                                       MacroPlan,
                                       null( Forecast ),
                                       SelectionSalesSegment.Data(),
                                       SelectionStockingPoint.Data(),
                                       SelectionProduct.Data(),
                                       GUIDateTimeSelectorStart.DateTime().Date(),
                                       GUIDateTimeSelectorEnd.DateTime().Date(),
                                       SelectionCurrency.Data(),
                                       SelectionUnitOfMeasure.Data(),
                                       ApplicationLibMacroPlanner.FormatStringToReal( EditorQuantity.Text() ),
                                       ApplicationLibMacroPlanner.FormatStringToReal( EditorPrice.Text() ),
                                       SelectionPriority.Data(),
                                       Dialog.Data().DemandUncertaintyPercentage(),
                                       Dialog.CheckBoxIsExcludedFromFulfillmentKPI().Checked(),
                                       true);
  *]
}
