Quintiq file version 2.0
#parent: pl_function_FCOS/btn_add_FCOS
Response OnClick () id:Response_FrmCustomOrderSpliteRow_btn_add_FCOS_OnClick
{
  #keys: '[414724.0.290316632]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebButton_OnClick'
  Precondition:
  [*
    return not isnull( dh_Paramer_FCOS.Data());
  *]
  QuillAction
  {
    Body:
    [*
      JResult := S_FunctionClass::SM_OrderToSpliteOrder( MacroPlan,dh_Paramer_FCOS.Data(),ef_SpliteReason_FCOS.Text());
      if( JResult.Get( "Status").GetBoolean())
      {
        FrmCustomOrderSpliteRow.Close();
        if( JResult.Get( "Msg").GetString().Length()>0)
        {
         WebMessageBox::Information(JResult.Get( "Msg").GetString());
        }
      }
      else
      {
        WebMessageBox::Warning(JResult.Get( "Msg").GetString());
      }
    *]
    GroupServerCalls: false
  }
}
