Quintiq file version 2.0
#parent: PanelOperationCost/DropDownListOperation
Response OnUserSelectionChanged (
  Operation selection
) id:Response_PanelOperationCost_DropDownListOperation_OnUserSelectionChanged
{
  #keys: '[145730.1.19762112]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnUserSelectionChanged'
  Enabled: false
  QuillAction
  {
    Body:
    [*
      // Change of unit will create new shadow object 
      // (Software bug, dropdownlist cannot have response else enabled/disabled will not work)
      // Workaround (Quote RfC here): disabled all response, use DataHolderSelectedUnit to source from this dropdownlist and rely on OnDataChanged
      // to replace DropDownList.OnUserChanged
      Form.SetShadowOperationCostWithDefaultAccountInfo( selection, DropDownListAccount.Data() );
      
      Form.SetCostLabel( EditFieldLengthOfTime.Text(),
                         DropDownStringListTimeUnit.Text(),
                         DropDownStringListCostDriver.Text() );
    *]
    GroupServerCalls: false
  }
}
