Quintiq file version 2.0
#parent: PanelInputLotSizeBatch/EditFieldInputLotSizeUOM
Response OnInputIdle () id:Response_PanelInputLotSizeBatch_EditFieldInputLotSizeUOM_OnInputIdle
{
  #keys: '[135040.0.268025297]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebEditField_OnInputIdle'
  QuillAction
  {
    Body:
    [*
      //show/hide component
      Form.UIShowHideComponent( false );
    *]
    GroupServerCalls: false
  }
}
