Quintiq file version 2.0
#parent: pnlContent/DropDownListStockingPoint
Response OnSelectionChanged (
  StockingPoint_MP selection
) id:Response_pnlContent_DropDownListStockingPoint_OnSelectionChanged
{
  #keys: '[150660.0.941470385]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  QuillAction
  {
    Body:
    [*
      // Update UOM
      // RFC: ddl are re-enabled after shown, this response is a workaround to re-disable the ddl
      Form.InitializeComponents( DropDownListProduct.Data(), selection );
    *]
    GroupServerCalls: false
  }
}
