Quintiq file version 2.0
#parent: #root
Method SetLabel (
  Product_MP product,
  StockingPoint_MP stockingpoint
) id:Method_DialogCreateEditSafetyStock_SetLabel
{
  #keys: '[136682.2.3551078]'
  Body:
  [*
    //Set Label
    
    productuom := guard( product.UnitOfMeasureName(), '' );
    pisp := select( product, ProductInStockingPoint_MP, pisp, pisp.StockingPoint_MP() = stockingpoint );
    
    uom := guard( pisp.UnitOfMeasureName(), productuom );
    
    lblCalculatedSafetyStock.Label( Translations::MP_DialogCreateEditSafetyStock_LabelSafetyStock( uom ) )
    efSafetyStockInQuantity.Label( Translations::MP_DialogCreateEditSafetyStock_SafetyStockQty( uom ) );
  *]
}
