Quintiq file version 2.0
#parent: PanelGeneral/DropDownListUOM
Response OnUserSelectionChanged (
  UnitOfMeasure_MP selection
) id:Response_PanelGeneral_DropDownListUOM_OnUserSelectionChanged
{
  #keys: '[135040.0.232670139]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnUserSelectionChanged'
  GroupServerCalls: true
  QuillAction
  {
    Body:
    [*
      //Set UOM name to label for LotSize
      Form.UISetLabelLotSize( selection.Name() );
      
      //todo!! when uom change, prompt warning image
    *]
  }
}
