Quintiq file version 2.0
Component PanelContent id:PanelContent_537
{
  #keys: '[139394.1.1054084090]'
  BaseType: 'WebPanel'
  Children:
  [
    Component EditFieldOutlierTolerance
    {
      #keys: '[139394.1.1054070857]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'MacroPlan.GlobalParameters_MP.OutlierTolerance'
        Label: 'Outlier tolerance (%)'
        Mask: 'POSNORMALREAL'
        Taborder: 0
        Tooltip: '<html>The range of tolerable difference between the actual value and the planned value.<br>For example, if the outlier tolerance is 20% and the planned inventory is 100,<br>then the actual value which is smaller than 80 or larger than 120 will be highlighted as violation.</html>'
      ]
    }
    Component EditFieldBiasTolerance
    {
      #keys: '[139394.1.1054070925]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'MacroPlan.GlobalParameters_MP.BiasTolerance'
        Label: 'Bias tolerance (%)'
        Mask: 'POSNORMALREAL'
        Taborder: 1
        Tooltip: '<html>The tolerable percentage of instances that are consistent between planned inventory and actual inventory.<br>For example, if the bias tolerance is 80% and less than 8 instances out of 10 have consistent value between planned inventory and actual inventory,<br>the product in stocking point will be highlighted as violation.</html>'
      ]
    }
  ]
  Properties:
  [
    Taborder: 0
  ]
}
