Quintiq file version 2.0
#parent: #root
Response OnClose () id:Response_FormSafetyStockParameter_OnClose
{
  #keys: '[136682.2.265022042]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebForm_OnClose'
  GroupServerCalls: true
  QuillAction
  {
    Body:
    [*
      //Register itself in the settings data holder
      DataHolderSettingsForms.Data().Remove( this );
    *]
  }
}
