Quintiq file version 2.0
Component PanelSanityCheckToolbar
{
  #keys: '[137862.0.664179838]'
  BaseType: 'WebPanel'
  Children:
  [
    Component ButtonRefresh id:ButtonRefresh_79
    {
      #keys: '[137862.0.664179951]'
      BaseType: 'WebButton'
      Properties:
      [
        ButtonSize: 'compact'
        Image: 'REFRESH'
        Taborder: 0
        Tooltip: 'Refresh sanity check messages'
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 0
  ]
}
