Quintiq file version 2.0
#root
#parent: LibMacroPlannerWebUI
OrphanComponent FormSanityCheck
{
  #keys: '[127710.2.1805001]'
  Accessibility: 'Extensible'
  BaseType: 'WebForm'
  Children:
  [
    #child: PanelSanityCheckContent
    #child: PanelSanityCheckToolbar
  ]
  Properties:
  [
    Image: 'BELL'
    MinimumColumns: 100
    MinimumRows: 20
    Title: 'Sanity Check'
    UseExistingInstance: true
  ]
}
