Quintiq file version 2.0
#parent: #root
Method SetLabels () id:Method_DialogCreateEditInventorySpecification_SetLabels
{
  #keys: '[122892.0.1429071839]'
  Body:
  [*
    // Set label quantity with unit of measure
    product := SelectionProduct.Data();
    productuom := guard( product.UnitOfMeasureName(), '' );
    pisp := select( product, ProductInStockingPoint_MP, pisp, pisp.StockingPoint_MP() = SelectionStockingPoint.Data() );
    
    uom := guard( pisp.UnitOfMeasureName(), productuom );
    
    LabelMinLevelInQuantity.Text( Translations::MP_Designer_DialogCreateEditInventorySpecification_SetLabelMinLevelInQuantity( uom ) );
    LabelMaxLevelInQuantity.Text( Translations::MP_Designer_DialogCreateEditInventorySpecification_SetMaxLevelInQuantity( uom ) );
  *]
}
