Quintiq file version 2.0
Component PanelImageExplanationManualStep
{
  #keys: '[133070.0.217540110]'
  BaseType: 'Panel'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 537 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ImageManualStep
        Position { startcolumn: 537 startrow: 107 endcolumn: 537 endrow: 107 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 107 parent: 0 }
    ]
  }
  Children:
  [
    Component ImageManualStep
    {
      #keys: '[133070.0.327260332]'
      BaseType: 'Image'
      Properties:
      [
        KeepRatio: true
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Border: true
    Visible: false
  ]
}
