Quintiq file version 2.0
Component GroupPanelSafetyStock
{
  #keys: '[113398.0.121289458]'
  BaseType: 'GroupPanel'
  ViewSecurity: 'SafetyStockCalculation'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 1 parent: 0 }
      GBFlow.Column { grow: 128 id: 2 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelDefaultServiceLevel
        Position { startcolumn: 1 startrow: 1 endcolumn: 1 endrow: 1 }
      }
      GBElement
      {
        Component => /EditorDefaultServiceLevel
        Position { startcolumn: 2 startrow: 1 endcolumn: 2 endrow: 1 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
    ]
  }
  Children:
  [
    #child: EditorDefaultServiceLevel
    Component LabelDefaultServiceLevel
    {
      #keys: '[113398.0.121296698]'
      BaseType: 'Label'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorDefaultServiceLevel'
        LayoutGroup: 'LabelDefaultValues'
        Shortcut: 'Alt+S'
        Text: 'Default &service level'
        Tooltip: 'Default expected service level on PISP ( 50 < Value < 100 )'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Text: 'Safety Stock'
    ModeledStringList ChildOrdering
    {
      c: EditorDefaultServiceLevel
      c: LabelDefaultServiceLevel
    }
  ]
}
