Quintiq file version 2.0
Component GroupPanel9
{
  #keys: '[124808.0.1138911426]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 11 parent: 0 }
      GBFlow.Column { grow: 128 id: 9 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelBottleneckThreshold
        Position { startcolumn: 11 startrow: 2 endcolumn: 11 endrow: 2 }
      }
      GBElement
      {
        Component => /EditorBottleneckThreshold
        Position { startcolumn: 9 startrow: 2 endcolumn: 9 endrow: 2 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 2 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelBottleneckThreshold
    {
      #keys: '[124808.0.1138911427]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorBottleneckThreshold'
        LayoutGroup: 'LabelBottleneckDetection'
        NumberLines: 1
        Shortcut: 'Alt+B'
        SizePosition: 'lt15 160 107 123'
        Text: '&Bottleneck threshold'
        Tooltip: 'Stocking point periods with utilization higher than the bottleneck threshold are marked as bottleneck.'
      ]
    }
    #child: EditorBottleneckThreshold
  ]
  Properties:
  [
    Text: 'Stocking point utilization threshold'
    ModeledStringList ChildOrdering
    {
      c: EditorBottleneckThreshold
      c: LabelBottleneckThreshold
    }
  ]
}
