Quintiq file version 2.0
#parent: GanttChartUnitCalendar/DataHolderSelectedUnits
Response OnDataChanged () id:Response_GanttChartUnitCalendar_DataHolderSelectedUnits_OnDataChanged
{
  #keys: '[132444.0.59192574]'
  Body:
  [*
    // This data holder is linked to the selected units in the navigation panel,
    // whenever the user select a different unit in the navigation panel, we
    // need to flush DataHolderHideUnits because the default behavior is
    // show all units when the selection is changed
    DataHolderHideUnits.Data().Flush();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDataChanged'
}
