Quintiq file version 2.0
Component GroupPanel673
{
  #keys: '[131962.0.10512634]'
  BaseType: 'GroupPanel'
  ViewSecurity: 'SafetyStockCalculation'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 825 parent: 0 }
      GBFlow.Column { grow: 0 id: 602 parent: 0 }
      GBFlow.Column { grow: 128 id: 868 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => CheckBoxBatchEditStandardDeviationLeadTime
        Position { startcolumn: 825 startrow: 763 endcolumn: 825 endrow: 763 }
      }
      GBElement
      {
        Component => Label
        Position { startcolumn: 602 startrow: 763 endcolumn: 602 endrow: 763 }
      }
      GBElement
      {
        Component => GUIDurationSelectorStandardDeviation
        Position { startcolumn: 868 startrow: 763 endcolumn: 868 endrow: 763 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 763 parent: 0 }
    ]
  }
  Children:
  [
    Component CheckBoxBatchEditStandardDeviationLeadTime
    {
      #keys: '[131962.0.10513061]'
      BaseType: 'CheckBox'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Text: ''
      ]
    }
    Component Label
    {
      #keys: '[131962.0.10513062]'
      BaseType: 'Label'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIDurationSelectorStandardDeviation'
        LayoutGroup: 'AdvPageEdit'
        Shortcut: 'Alt+T'
        Text: 'S&tandard deviation lead time'
        Tooltip: 'This represents uncertainty in the lead time and is only relevant when calculation of safety stock levels is used'
      ]
    }
    Component GUIDurationSelectorStandardDeviation
    {
      #keys: '[131962.0.10513063]'
      BaseType: 'GUIDurationSelector'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.StandardDeviationLeadTimeLane'
      ]
    }
  ]
  Properties:
  [
    Text: 'Safety stock'
    ModeledStringList ChildOrdering
    {
      c: CheckBoxBatchEditStandardDeviationLeadTime
      c: Label
      c: GUIDurationSelectorStandardDeviation
    }
  ]
}
