Quintiq file version 2.0
#parent: Toolbar/ButtonOk
Response OnClick () id:Response_Toolbar_ButtonOk_OnClick
{
  #keys: '[11660.0.62385711]'
  Body:
  [*
    // Apply changes
    
    Dialog.ApplyChanges();
    Dialog.SetAttributesAfterOnApplyData();
    Dialog.EndModal(1);
  *]
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    sanitycheckfeedback := '';
    return not isnull( Dialog.Data() )  //the only time Dialog.Data null check is required is when this dlg is opened for view initialization. 
           and Lane::ValidateInput( feedback,
                                    sanitycheckfeedback,
                                    MacroPlan,
                                    SelectionUnit.Data(),
                                    Dialog.Data().WrappedInstance(),
                                    EditorID.Text(),
                                    EditorName.Text(),
                                    CheckBoxHasStart.Checked(),
                                    GUIDateTimeSelectorStart.DateTime().Date(),
                                    CheckBoxHasEnd.Checked(),
                                    GUIDateTimeSelectorEnd.DateTime().Date(),
                                    GUIDurationSelectorPreprocessingTime.Duration(),
                                    true);
  *]
}
