Quintiq file version 2.0
Component PanelDataExchangeFramework
{
  #keys: '[132894.0.214246112]'
  BaseType => //DialogEDIImportExport/PanelDataExchangeFramework
  IsDerived: true
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 713 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => //DialogEDIImportExport/PanelDataExchangeFramework/ImageDEF
        Position { startcolumn: 713 startrow: 564 endcolumn: 713 endrow: 564 }
      }
      GBElement
      {
        Component => /PanelDEFManufacturingDemand
        Position { startcolumn: 713 startrow: 490 endcolumn: 713 endrow: 490 }
      }
      GBElement
      {
        Component => /PanelDEFMPPlan
        Position { startcolumn: 713 startrow: 907 endcolumn: 713 endrow: 907 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 564 parent: 0 }
      GBFlow.Row { grow: 0 id: 490 parent: 0 }
      GBFlow.Row { grow: 128 id: 907 parent: 0 }
    ]
  }
  Children:
  [
    #child: PanelDEFManufacturingDemand
    #child: PanelDEFMPPlan
  ]
  Properties:
  [
    ModeledStringList ChildOrdering
    {
      c: ImageDEF
      c: PanelDEFManufacturingDemand
      c: PanelDEFMPPlan
    }
  ]
}
