Quintiq file version 2.0
#parent: GroupPanelTargets/ButtonResetTargets
Response OnClick () id:Response_GroupPanelTargets_ButtonResetTargets_OnClick
{
  #keys: '[122872.0.2141583238]'
  Body:
  [*
    // Reset the targets of the scaling algorithm to their default values
    Dialog.ResetTargets();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    return MacroPlan::HasMacroPlan( MacroPlan, feedback );
  *]
}
