Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogEditAutomaticScaling
{
  #keys: '[122872.0.1897839895]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  Databinding: 'shadow[AlgorithmScaling]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 1 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => GroupPanelTargets
        Position { startcolumn: 1 startrow: 15 endcolumn: 1 endrow: 15 }
      }
      GBElement
      {
        Component => GroupPanelGoalWeights
        Position { startcolumn: 1 startrow: 17 endcolumn: 1 endrow: 17 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 15 parent: 0 }
      GBFlow.Row { grow: 0 id: 17 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    #child: GroupPanelTargets
    #child: GroupPanelGoalWeights
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 590
    InitialPlacement: 'floating'
    Title: 'Automatic scaling parameters'
    Width: 530
    ModeledStringList ChildOrdering
    {
      c: GroupPanelTargets
      c: GroupPanelGoalWeights
      c: Toolbar
    }
  ]
}
