Quintiq file version 2.0
Component SWF_PanelWorkflowParameters
{
  #keys: '[113694.2.1237087727]'
  BaseType: 'SWF_PanelWorkflowParameters'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 471 parent: 471 }
      GBFlow.Column { grow: 128 id: 492 parent: 492 }
    ]
    Elements:
    [
      GBElement
      {
        Component: 'CheckBoxIsWorkflowEnabled'
        Position { startcolumn: 471 startrow: 959 endcolumn: 471 endrow: 959 }
      }
      GBElement
      {
        Component: 'GroupPanelCurrentDate'
        Position { startcolumn: 471 startrow: 956 endcolumn: 492 endrow: 956 }
      }
      GBElement
      {
        Component: 'CheckBoxEnableSOAP'
        Position { startcolumn: 471 startrow: 544 endcolumn: 471 endrow: 544 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 959 parent: 959 }
      GBFlow.Row { grow: 0 id: 544 parent: 544 }
      GBFlow.Row { grow: 0 id: 956 parent: 956 }
    ]
  }
}
