Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogImportProfile
{
  #keys: '[132894.0.15397609]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 485 parent: 0 }
      GBFlow.Column { grow: 128 id: 140 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LayeredPanel209
        Position { startcolumn: 485 startrow: 860 endcolumn: 140 endrow: 860 }
      }
      GBElement
      {
        Component => CheckBoxRefreshFromSource
        Position { startcolumn: 485 startrow: 500 endcolumn: 485 endrow: 500 }
      }
      GBElement
      {
        Component => CheckBoxOverwriteManualConfig
        Position { startcolumn: 485 startrow: 174 endcolumn: 485 endrow: 174 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 860 parent: 0 }
      GBFlow.Row { grow: 0 id: 500 parent: 0 }
      GBFlow.Row { grow: 0 id: 174 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar849
    Component LayeredPanel209
    {
      #keys: '[132894.0.15402830]'
      BaseType: 'LayeredPanel'
      Children:
      [
        #child: ListImportProfile
      ]
    }
    Component CheckBoxRefreshFromSource
    {
      #keys: '[132894.0.15414824]'
      BaseType: 'CheckBox'
      Properties:
      [
        Checkstate: 1
        HasMemory: 'SettingsOnly'
        Shortcut: 'Alt+R'
        Text: '&Refresh from source'
        Tooltip: 'Check this option to first refresh the staged data with data from the specified source before importing the staged data'
      ]
    }
    Component CheckBoxOverwriteManualConfig
    {
      #keys: '[132894.0.15415017]'
      BaseType: 'CheckBox'
      Properties:
      [
        Checkstate: 1
        HasMemory: 'SettingsOnly'
        Shortcut: 'Alt+O'
        Text: '&Overwrite manual configurations'
        Tooltip: 'Check this option to overwrite user-created or edited data for imported objects'
      ]
    }
  ]
  Properties:
  [
    EnterButton: 'btnExecuteActive'
    EscapeButton: 'btnClose'
    Height: 28
    IncludeInView: true
    Title: 'Import profiles'
    Width: 160
    WindowState: 'minimized'
    ModeledStringList ChildOrdering
    {
      c: LayeredPanel209
      c: CheckBoxRefreshFromSource
      c: CheckBoxOverwriteManualConfig
      c: Toolbar849
    }
  ]
}
