Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent LibPTF_pnlTestRunner
{
  #keys: '[136682.0.314427109]'
  BaseType: 'Panel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 59 parent: 0 }
      GBFlow.Column { grow: 0 id: 60 parent: 0 }
      GBFlow.Column { grow: 0 id: 61 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => chkLoggedStartMarker
        Position { startcolumn: 60 startrow: 16 endcolumn: 60 endrow: 16 }
      }
      GBElement
      {
        Component => chkActionDone
        Position { startcolumn: 61 startrow: 16 endcolumn: 61 endrow: 16 }
      }
      GBElement
      {
        Component => btnPTFStatus
        Position { startcolumn: 59 startrow: 16 endcolumn: 59 endrow: 16 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 16 parent: 0 }
    ]
  }
  Children:
  [
    Component chkActionDone
    {
      #keys: '[102890.0.1865405312]'
      BaseType: 'CheckBox'
      Properties:
      [
        Enabled: false
        SizePosition: 'rb163 86 20 4'
        Text: 'End marking'
      ]
    }
    Component chkLoggedStartMarker
    {
      #keys: '[102890.0.1865405313]'
      BaseType: 'CheckBox'
      Properties:
      [
        Enabled: false
        SizePosition: 'rb252 170 20 4'
        Text: 'Start marking'
      ]
    }
    Component gtPTF
    {
      #keys: '[102890.0.1865405317]'
      BaseType: 'GUITimer'
      Properties:
      [
        Enabled: false
        Interval: 100
        PosX: 148
        PosY: 64
        SizePosition: 'lt-130 -104 62 88'
      ]
    }
    Component gtPTFKickStart
    {
      #keys: '[102890.0.1880797200]'
      BaseType: 'GUITimer'
      Properties:
      [
        Enabled: false
        Interval: 100
        PosX: 147
        PosY: 33
        SizePosition: 'lt269 295 108 134'
      ]
    }
    Component vhLogStart
    {
      #keys: '[103546.0.54652306]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 64
        PosY: 31
      ]
    }
    Component vhAutoClose
    {
      #keys: '[103546.0.81355542]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 27
        PosY: 60
      ]
    }
    Component vhLogging
    {
      #keys: '[105690.0.246954464]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 27
        PosY: 31
      ]
    }
    Component vhResultLogPath
    {
      #keys: '[105690.0.247211998]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 65
        PosY: 62
      ]
    }
    Component vhDoActionInfoReturn
    {
      #keys: '[104342.0.773994982]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 66
        PosY: 93
      ]
    }
    Component vhPendingActions
    {
      #keys: '[104342.0.867521338]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 102
        PosY: 30
      ]
    }
    Component vhSharedRepository
    {
      #keys: '[104342.0.867524820]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 105
        PosY: 62
      ]
    }
    Component btnPTFStatus
    {
      #keys: '[104342.0.867766963]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'MONITOR'
        SizePosition: 'lt25 47 3 25'
        Tooltip: 'PTF status'
      ]
    }
    Component vhAsyncActionStatus
    {
      #keys: '[105690.0.892938783]'
      BaseType: 'ValueHolder'
      Properties:
      [
        DataBinding: 'MacroPlan.Algorithm.LastAlgorithmRun.Duration'
        PosX: 185
        PosY: 33
      ]
    }
    Component vhPTFExecutionStatus
    {
      #keys: '[105690.0.892939622]'
      BaseType: 'ValueHolder'
      Properties:
      [
        PosX: 185
        PosY: 64
        Value: 'Inactive'
      ]
    }
  ]
  Properties:
  [
    SizePosition: 'ss0 5 0 4'
    ModeledStringList ChildOrdering
    {
      c: btnPTFStatus
      c: gtPTF
      c: gtPTFKickStart
      c: vhLogStart
      c: vhDoActionInfoReturn
      c: chkLoggedStartMarker
      c: chkActionDone
      c: vhAutoClose
      c: vhLogging
      c: vhResultLogPath
      c: vhPendingActions
      c: vhSharedRepository
      c: vhAsyncActionStatus
      c: vhPTFExecutionStatus
    }
  ]
}
