Quintiq file version 2.0
Component TabPageSanityCheck
{
  #keys: '[11660.1.49937125]'
  BaseType: 'TabPage'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 9 parent: 0 }
      GBFlow.Column { grow: 128 id: 5 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelSanityCheckLimit
        Position { startcolumn: 9 startrow: 12 endcolumn: 9 endrow: 12 }
      }
      GBElement
      {
        Component => /EditorSanityCheckLimit
        Position { startcolumn: 5 startrow: 12 endcolumn: 5 endrow: 12 }
      }
      GBElement
      {
        Component => /GroupPanelData
        Position { startcolumn: 9 startrow: 8 endcolumn: 5 endrow: 8 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 12 parent: 0 }
      GBFlow.Row { grow: 128 id: 8 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelSanityCheckLimit
    {
      #keys: '[11660.1.49937142]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorSanityCheckLimit'
        LayoutGroup: 'LabelSanityCheck'
        NumberLines: 1
        Shortcut: 'Alt+M'
        SizePosition: 'lt56 160 26 42'
        Text: '&Max number per group'
        Tooltip: 'Max number of messages per group to be shown in the sanity check dialog.'
      ]
    }
    #child: EditorSanityCheckLimit
    #child: GroupPanelData
  ]
  Properties:
  [
    Title: 'Sanity check'
    ModeledStringList ChildOrdering
    {
      c: EditorSanityCheckLimit
      c: LabelSanityCheckLimit
      c: GroupPanelData
    }
  ]
}
