Quintiq file version 2.0
#parent: #root
Method PTF_ValidateParametersSizeShowCustomMsg (
  String action,
  Number actualsize,
  Number expectedsize,
  String custommsg
) as String id:Method_LibPTF_dlgCreateEditTestScript_PTF_ValidateParametersSizeShowCustomMsg
{
  #keys: '[104342.0.770352863]'
  Body:
  [*
    // Validate the parameter - Number of parameters expected, with custom message
    errormsg := "";
    
    if( actualsize <> expectedsize )
    {
      errormsg := custommsg;
    }
    
    return errormsg;
  *]
}
