Quintiq file version 2.0
#root
#parent: MPTestController
OrphanComponent LibPTF_dlgCreateEditTestScript
{
  #keys: '[136682.0.314346570]'
  BaseType: 'Dialog'
  Databinding: 'shadow[LibPTF_TestScript]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 5 parent: 0 }
      GBFlow.Column { grow: 0 id: 63 parent: 0 }
      GBFlow.Column { grow: 0 id: 70 parent: 0 }
      GBFlow.Column { grow: 128 id: 68 parent: 0 }
      GBFlow.Column { grow: 0 id: 62 parent: 0 }
      GBFlow.Column { grow: 0 id: 25 parent: 0 }
      GBFlow.Column { grow: 64 id: 57 parent: 0 }
      GBFlow.Column { grow: 0 id: 14 parent: 0 }
      GBFlow.Column { grow: 0 id: 41 parent: 0 }
      GBFlow.Column { grow: 0 id: 42 parent: 0 }
      GBFlow.Column { grow: 0 id: 36 parent: 0 }
      GBFlow.Column { grow: 0 id: 11 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => lblOffset
        Position { startcolumn: 5 startrow: 47 endcolumn: 5 endrow: 47 }
      }
      GBElement
      {
        Component => lblSession
        Position { startcolumn: 5 startrow: 36 endcolumn: 5 endrow: 36 }
      }
      GBElement
      {
        Component => lblConcurrent
        Position { startcolumn: 57 startrow: 36 endcolumn: 57 endrow: 36 }
      }
      GBElement
      {
        Component => lblProject
        Position { startcolumn: 5 startrow: 4 endcolumn: 5 endrow: 4 }
      }
      GBElement
      {
        Component => edtTotalNrOfSessions
        Position { startcolumn: 63 startrow: 36 endcolumn: 62 endrow: 36 }
      }
      GBElement
      {
        Component => edtNrOfSimultaneousSessions
        Position { startcolumn: 14 startrow: 36 endcolumn: 36 endrow: 36 }
      }
      GBElement
      {
        Component => durOffset
        Position { startcolumn: 63 startrow: 47 endcolumn: 63 endrow: 47 }
      }
      GBElement
      {
        Component => lblView
        Position { startcolumn: 5 startrow: 5 endcolumn: 5 endrow: 5 }
      }
      GBElement
      {
        Component => lblUserName
        Position { startcolumn: 5 startrow: 39 endcolumn: 5 endrow: 39 }
      }
      GBElement
      {
        Component => edtView
        Position { startcolumn: 63 startrow: 5 endcolumn: 36 endrow: 5 }
      }
      GBElement
      {
        Component => lblPassword
        Position { startcolumn: 57 startrow: 39 endcolumn: 57 endrow: 39 }
      }
      GBElement
      {
        Component => edtUser
        Position { startcolumn: 63 startrow: 39 endcolumn: 62 endrow: 39 }
      }
      GBElement
      {
        Component => lblCustomParameter
        Position { startcolumn: 5 startrow: 8 endcolumn: 5 endrow: 8 }
      }
      GBElement
      {
        Component => imgTestScriptStartOffset
        Position { startcolumn: 25 startrow: 47 endcolumn: 25 endrow: 47 }
      }
      GBElement
      {
        Component => edtPassword
        Position { startcolumn: 14 startrow: 39 endcolumn: 36 endrow: 39 }
      }
      GBElement
      {
        Component => lblClientTypes
        Position { startcolumn: 5 startrow: 30 endcolumn: 5 endrow: 30 }
      }
      GBElement
      {
        Component => edtCustomArgument
        Position { startcolumn: 63 startrow: 8 endcolumn: 36 endrow: 8 }
      }
      GBElement
      {
        Component => selClientType
        Position { startcolumn: 63 startrow: 30 endcolumn: 62 endrow: 30 }
      }
      GBElement
      {
        Component => lblTestScript
        Position { startcolumn: 5 startrow: 28 endcolumn: 5 endrow: 28 }
      }
      GBElement
      {
        Component => pnlTestScript
        Position { startcolumn: 63 startrow: 28 endcolumn: 36 endrow: 11 }
      }
      GBElement
      {
        Component => lblStartClientDelay
        Position { startcolumn: 57 startrow: 47 endcolumn: 57 endrow: 47 }
      }
      GBElement
      {
        Component => durMinStartClientDelay
        Position { startcolumn: 14 startrow: 47 endcolumn: 14 endrow: 47 }
      }
      GBElement
      {
        Component => lblStartClientDelayTo
        Position { startcolumn: 41 startrow: 47 endcolumn: 41 endrow: 47 }
      }
      GBElement
      {
        Component => durMaxStartClientDelay
        Position { startcolumn: 42 startrow: 47 endcolumn: 42 endrow: 47 }
      }
      GBElement
      {
        Component => imgSession
        Position { startcolumn: 25 startrow: 36 endcolumn: 25 endrow: 36 }
      }
      GBElement
      {
        Component => imgConcurrent
        Position { startcolumn: 11 startrow: 36 endcolumn: 11 endrow: 36 }
      }
      GBElement
      {
        Component => imgStartClientOffset
        Position { startcolumn: 11 startrow: 47 endcolumn: 11 endrow: 47 }
      }
      GBElement
      {
        Component => imgProject
        Position { startcolumn: 11 startrow: 4 endcolumn: 11 endrow: 4 }
      }
      GBElement
      {
        Component => imgView
        Position { startcolumn: 11 startrow: 5 endcolumn: 11 endrow: 5 }
      }
      GBElement
      {
        Component => imgUserName
        Position { startcolumn: 25 startrow: 39 endcolumn: 25 endrow: 39 }
      }
      GBElement
      {
        Component => imgPassword
        Position { startcolumn: 11 startrow: 39 endcolumn: 11 endrow: 39 }
      }
      GBElement
      {
        Component => imgCustomParameter
        Position { startcolumn: 11 startrow: 8 endcolumn: 11 endrow: 8 }
      }
      GBElement
      {
        Component => imgClientTypes
        Position { startcolumn: 25 startrow: 30 endcolumn: 25 endrow: 30 }
      }
      GBElement
      {
        Component => imgTestScript
        Position { startcolumn: 11 startrow: 28 endcolumn: 11 endrow: 28 }
      }
      GBElement
      {
        Component => imgLogging
        Position { startcolumn: 11 startrow: 30 endcolumn: 11 endrow: 30 }
      }
      GBElement
      {
        Component => lblLogging
        Position { startcolumn: 57 startrow: 30 endcolumn: 57 endrow: 30 }
      }
      GBElement
      {
        Component => selProject
        Position { startcolumn: 63 startrow: 4 endcolumn: 36 endrow: 4 }
      }
      GBElement
      {
        Component => lblDescription
        Position { startcolumn: 5 startrow: 32 endcolumn: 5 endrow: 32 }
      }
      GBElement
      {
        Component => edtDescription
        Position { startcolumn: 63 startrow: 32 endcolumn: 36 endrow: 32 }
      }
      GBElement
      {
        Component => selLogging
        Position { startcolumn: 14 startrow: 30 endcolumn: 36 endrow: 30 }
      }
      GBElement
      {
        Component => imgDescription
        Position { startcolumn: 11 startrow: 32 endcolumn: 11 endrow: 32 }
      }
      GBElement
      {
        Component => pnlCheckBoxOffset
        Position { startcolumn: 70 startrow: 47 endcolumn: 62 endrow: 47 }
      }
      GBElement
      {
        Component => pnlCheckBoxStartClientDelay
        Position { startcolumn: 36 startrow: 47 endcolumn: 36 endrow: 47 }
      }
      GBElement
      {
        Component => lblDatasetKindFolder
        Position { startcolumn: 5 startrow: 51 endcolumn: 5 endrow: 51 }
      }
      GBElement
      {
        Component => edtDatasetFolder
        Position { startcolumn: 62 startrow: 51 endcolumn: 62 endrow: 51 }
      }
      GBElement
      {
        Component => edtDataset
        Position { startcolumn: 14 startrow: 51 endcolumn: 36 endrow: 51 }
      }
      GBElement
      {
        Component => lblDatasetFolderSlash
        Position { startcolumn: 68 startrow: 51 endcolumn: 68 endrow: 51 }
      }
      GBElement
      {
        Component => lblDatasetkind
        Position { startcolumn: 57 startrow: 51 endcolumn: 57 endrow: 51 }
      }
      GBElement
      {
        Component => edtDatasetKind
        Position { startcolumn: 63 startrow: 51 endcolumn: 70 endrow: 51 }
      }
      GBElement
      {
        Component => imgDatasetKind
        Position { startcolumn: 25 startrow: 51 endcolumn: 25 endrow: 51 }
      }
      GBElement
      {
        Component => imgDatasetInstance
        Position { startcolumn: 11 startrow: 51 endcolumn: 11 endrow: 51 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 32 parent: 0 }
      GBFlow.Row { grow: 0 id: 39 parent: 0 }
      GBFlow.Row { grow: 0 id: 30 parent: 0 }
      GBFlow.Row { grow: 0 id: 51 parent: 0 }
      GBFlow.Row { grow: 0 id: 4 parent: 0 }
      GBFlow.Row { grow: 0 id: 5 parent: 0 }
      GBFlow.Row { grow: 0 id: 8 parent: 0 }
      GBFlow.Row { grow: 0 id: 36 parent: 0 }
      GBFlow.Row { grow: 0 id: 47 parent: 0 }
      GBFlow.Row { grow: 8 id: 28 parent: 0 }
      GBFlow.Row { grow: 128 id: 11 parent: 0 }
    ]
  }
  Children:
  [
    #child: edtTotalNrOfSessions
    Component lblSession
    {
      #keys: '[102890.0.1878413663]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtTotalNrOfSessions'
        NumberLines: 1
        Shortcut: 'Alt+N'
        SizePosition: 'lt82 127 18 32'
        Text: 'Sessio&ns'
        Transparent: true
      ]
    }
    #child: edtNrOfSimultaneousSessions
    Component lblConcurrent
    {
      #keys: '[102890.0.1878414386]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtNrOfSimultaneousSessions'
        NumberLines: 1
        Shortcut: 'Alt+T'
        SizePosition: 'lt73 127 48 62'
        Text: 'Concurren&t'
        Transparent: true
      ]
    }
    Component durOffset
    {
      #keys: '[102890.0.1878414387]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.Offset'
        Format: 'h:m:s'
        SizePosition: 'lt147 221 73 101'
      ]
    }
    Component lblOffset
    {
      #keys: '[102890.0.1878414388]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'durOffset'
        NumberLines: 1
        Shortcut: 'Alt+F'
        SizePosition: 'lt19 127 79 93'
        Text: 'Test script start o&ffset'
        Transparent: true
      ]
    }
    Component lblProject
    {
      #keys: '[102890.0.1878415111]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'selProject'
        NumberLines: 1
        Shortcut: 'Alt+R'
        SizePosition: 'lt94 127 111 125'
        Text: 'P&roject'
        Transparent: true
      ]
    }
    #child: edtView
    Component lblView
    {
      #keys: '[102890.0.1878415834]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtView'
        NumberLines: 1
        Shortcut: 'Alt+E'
        SizePosition: 'lt101 127 141 155'
        Text: 'Vi&ew'
        Transparent: true
      ]
    }
    #child: edtUser
    Component lblUserName
    {
      #keys: '[102890.0.1878416557]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtUser'
        NumberLines: 1
        Shortcut: 'Alt+U'
        SizePosition: 'lt75 127 171 185'
        Text: '&User name'
        Transparent: true
      ]
    }
    #child: edtPassword
    Component lblPassword
    {
      #keys: '[102890.0.1878417280]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtPassword'
        NumberLines: 1
        Shortcut: 'Alt+W'
        SizePosition: 'lt77 127 201 215'
        Text: 'Pass&word'
        Transparent: true
      ]
    }
    Component lblCustomParameter
    {
      #keys: '[102890.0.1885150472]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtCustomArgument'
        NumberLines: 1
        Shortcut: 'Alt+P'
        SizePosition: 'lt39 127 230 244'
        Text: '&Parameter(s)'
        Transparent: true
      ]
    }
    #child: edtCustomArgument
    #child: selClientType
    Component lblClientTypes
    {
      #keys: '[102890.0.1885161557]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'selClientType'
        NumberLines: 1
        Shortcut: 'Alt+Y'
        SizePosition: 'lt77 127 258 272'
        Text: 'Client t&ype'
        Transparent: true
      ]
    }
    #child: pnlTestScript
    Component lblTestScript
    {
      #keys: '[104342.0.282463957]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'selKeyWord'
        NumberLines: 1
        Shortcut: 'Alt+S'
        SizePosition: 'lt77 127 285 299'
        Text: '&Script'
        Transparent: true
      ]
    }
    Component lblStartClientDelay
    {
      #keys: '[104342.0.291572632]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'durMinStartClientDelay'
        NumberLines: 1
        Shortcut: 'Alt+D'
        SizePosition: 'rt327 216 79 93'
        Text: 'Start client &delay range'
        Transparent: true
      ]
    }
    Component durMinStartClientDelay
    {
      #keys: '[104342.0.291572633]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.MinStartClientDelay'
        Format: 'h:m:s'
        SizePosition: 'rt205 130 73 101'
      ]
    }
    Component durMaxStartClientDelay
    {
      #keys: '[104342.0.291572635]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.MaxStartClientDelay'
        Format: 'h:m:s'
        SizePosition: 'rt112 37 73 101'
      ]
    }
    Component imgLogging
    {
      #keys: '[104342.0.296368160]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'center'
        SizePosition: 'rb31 15 50 34'
        Tooltip: 'Type of logging that the client will do <br> Full : logging is done to files and the results are shown in the Controller UI <br> File : logging is done to files only <br> Disabled : No logging is done'
        Transparent: true
      ]
    }
    Component imgTestScript
    {
      #keys: '[104342.0.296371598]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rb31 15 77 61'
        Tooltip: 'Test execution script'
        Transparent: true
      ]
    }
    Component imgClientTypes
    {
      #keys: '[104342.0.296374991]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 261 277'
        Tooltip: 'Type of client that will be started'
        Transparent: true
      ]
    }
    Component imgCustomParameter
    {
      #keys: '[104342.0.296376928]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 232 248'
        Tooltip: 'Commandline arguments that will be used when the client is started'
        Transparent: true
      ]
    }
    Component imgPassword
    {
      #keys: '[104342.0.296379841]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 203 219'
        Tooltip: 'Password that will be used when the client is started'
        Transparent: true
      ]
    }
    Component imgUserName
    {
      #keys: '[104342.0.296381778]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 174 190'
        Tooltip: 'Username that will be used when the client is started'
        Transparent: true
      ]
    }
    Component imgView
    {
      #keys: '[104342.0.296383699]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 143 159'
        Tooltip: 'View that will be used when the client is started'
        Transparent: true
      ]
    }
    Component imgProject
    {
      #keys: '[104342.0.296385620]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 113 129'
        Tooltip: 'Project that will be used when the client is started'
        Transparent: true
      ]
    }
    Component imgStartClientOffset
    {
      #keys: '[104342.0.296387541]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 81 97'
        Tooltip: 'Delay taken into account before the next client is started'
        Transparent: true
      ]
    }
    Component imgTestScriptStartOffset
    {
      #keys: '[104342.0.296389478]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        SizePosition: 'lt228 244 80 96'
        Tooltip: 'Delay taken into account before the next test script is started'
        Transparent: true
      ]
    }
    Component imgConcurrent
    {
      #keys: '[104342.0.296390471]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 49 65'
        Tooltip: 'Number of clients to run concurrently'
        Transparent: true
      ]
    }
    Component imgSession
    {
      #keys: '[104342.0.296393432]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'center'
        SizePosition: 'rt31 15 19 35'
        Tooltip: 'Number of clients to run for this test script'
        Transparent: true
      ]
    }
    #child: tlb
    Component lblLogging
    {
      #keys: '[105690.0.148987535]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'selLogging'
        Shortcut: 'Alt+L'
        Text: '&Logging'
        Transparent: true
      ]
    }
    #child: selProject
    Component lblDescription
    {
      #keys: '[103546.0.78624838]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtDescription'
        NumberLines: 1
        Shortcut: 'Alt+I'
        SizePosition: 'lt82 127 18 32'
        Text: 'Descr&iption'
        Transparent: true
      ]
    }
    #child: edtDescription
    #child: selLogging
    Component imgDescription
    {
      #keys: '[104342.0.708843654]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 49 65'
        Tooltip: 'Description of the test script (purposes, remarks, etc)'
        Transparent: true
      ]
    }
    Component lblStartClientDelayTo
    {
      #keys: '[104342.0.291572634]'
      BaseType: 'Label'
      Properties:
      [
        NumberColumns: 1
        NumberLines: 1
        SizePosition: 'rt124 118 80 94'
        Text: '~'
        Transparent: true
      ]
    }
    #child: pnlCheckBoxOffset
    #child: pnlCheckBoxStartClientDelay
    Component lblDatasetKindFolder
    {
      #keys: '[104342.0.871518988]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtDatasetKind'
        NumberLines: 1
        Shortcut: 'Alt+K'
        SizePosition: 'lt77 127 258 272'
        Text: 'Dataset &kind / folder'
        Transparent: true
      ]
    }
    #child: edtDatasetFolder
    #child: edtDataset
    Component lblDatasetFolderSlash
    {
      #keys: '[104342.0.871614369]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'center'
        FocusControl: 'edtDataset'
        NumberLines: 1
        SizePosition: 'lt77 127 258 272'
        Text: '/'
        Transparent: true
      ]
    }
    Component lblDatasetkind
    {
      #keys: '[104342.0.871618353]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'edtDataset'
        NumberLines: 1
        Shortcut: 'Alt+A'
        SizePosition: 'lt77 127 201 215'
        Text: 'D&ataset instance'
        Transparent: true
      ]
    }
    #child: edtDatasetKind
    Component imgDatasetKind
    {
      #keys: '[104342.0.871626339]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'center'
        SizePosition: 'rb31 15 50 34'
        Tooltip: 'Kind of dataset that will be loaded / Folder from which the dataset will be loaded when the client is started'
        Transparent: true
      ]
    }
    Component imgDatasetInstance
    {
      #keys: '[104342.0.871627316]'
      BaseType: 'Image'
      GBLayout
      {
        Type: 'internal[GBLayoutDefinition]'
        Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
      }
      Properties:
      [
        DesiredSize: 16
        Image: 'ABOUT'
        MergePosition: 'bottomleft'
        SizePosition: 'rt31 15 261 277'
        Tooltip: 'Name of the dataset that will be loaded when the client is started'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 734
    InitialPlacement: 'floating'
    ResizeStrategy: 'vertical'
    Title: 'Create Edit Test Script'
    Width: 818
    ModeledStringList ChildOrdering
    {
      c: imgCustomParameter
      c: imgUserName
      c: imgView
      c: imgPassword
      c: imgDatasetInstance
      c: imgClientTypes
      c: imgLogging
      c: imgTestScript
      c: imgProject
      c: imgStartClientOffset
      c: imgTestScriptStartOffset
      c: lblStartClientDelayTo
      c: imgDatasetKind
      c: imgDescription
      c: edtDescription
      c: lblDescription
      c: imgConcurrent
      c: imgSession
      c: lblStartClientDelay
      c: lblProject
      c: lblView
      c: lblConcurrent
      c: lblSession
      c: lblOffset
      c: edtUser
      c: edtPassword
      c: lblUserName
      c: selClientType
      c: selLogging
      c: lblDatasetFolderSlash
      c: lblDatasetKindFolder
      c: lblPassword
      c: lblDatasetkind
      c: lblCustomParameter
      c: lblClientTypes
      c: edtDatasetKind
      c: lblTestScript
      c: edtDatasetFolder
      c: edtDataset
      c: selProject
      c: edtView
      c: edtCustomArgument
      c: edtTotalNrOfSessions
      c: edtNrOfSimultaneousSessions
      c: durOffset
      c: pnlCheckBoxOffset
      c: durMinStartClientDelay
      c: durMaxStartClientDelay
      c: pnlCheckBoxStartClientDelay
      c: pnlTestScript
      c: tlb
      c: lblLogging
    }
  ]
}
