Quintiq file version 2.0
#parent: ListScopeElementOnRun/ValueHolderSelected
Response OnCreated () id:Response_ListScopeElementOnRun_ValueHolderSelected_OnCreated
{
  #keys: '[139164.0.2034057513]'
  Body:
  [*
    LibOpt_FormScopeElement.UpdateFilters( this.Value() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
