Quintiq file version 2.0
#parent: #root
Method ClickBtnOk () id:Method_DialogFillingCapacityOrder_ClickBtnOk
{
  #keys: '[414382.0.402531772]'
  Body:
  [*
    // Disabled button to prevent the possibility of multiple firing
    
    //btnOk.Enabled(false,'');
    
    // OnOk
    this.ApplyChanges();
    
    //DataHolderFillingCapacityOrder.Data().Commit();
    
    //if( not isnull( DataHolderForm.Data() ) )
    //{
    //  // Access the form, select the new assumption
    //  DataHolderForm.Data().ListAssumptions().SelectByKey( DataHolderDialogData.Data().WrappedInstance().Key() );
    //}
    
    this.Close();
  *]
}
