Quintiq file version 2.0
#parent: #root
Method ResetSupplyChainOverviewWarning () id:Method_FormSupplyChainOverview_ResetSupplyChainOverviewWarning
{
  #keys: '[113694.2.1023686581]'
  Body:
  [*
    /* Value holder is reset to empty to indicate that no changes have
    been made with respect to the last redefined view */
    
    ValueHolderIsShownSupplyChainOverviewWarning.Value('');
  *]
}
