Quintiq file version 2.0
#parent: PTFPanelTestController/chkLoggedStartMarker
Response OnChange () id:Response_PTFPanelTestController_chkLoggedStartMarker_OnChange
{
  #keys: '[136682.0.314463174]'
  Body:
  [*
    // Auto close dialgo SWF_DialgoEditUser for PTF 
    dlg := Application.Frame().FindChildObject( 'SWF_DialogEditUser' ).astype( SWF_DialogEditUser );
    if ( not isnull ( dlg ) )
    {
      dlg.EndModal( 0 );
    }
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnChange'
}
