Quintiq file version 2.0
#parent: ToolbarMain/ValueHolder
Response OnValueChanged () id:Response_ToolbarMain_ValueHolder_OnValueChanged
{
  #keys: '[110880.7.49193059]'
  Body:
  [*
    // Update icon and tooltip of the run optimizer button
    ApplicationLibMacroPlanner.UpdateOptimizerRunButton();
    // Refresh matrix when smart plan job returns the result
    ApplicationLibMacroPlanner.RefreshFormSupplyPlanWebClient();
    
    ApplicationLibMacroPlanner.Optimizer_UpdateIconResultStatus();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_ValueHolder_OnValueChanged'
  Precondition:
  [*
    return MacroPlan::HasMacroPlan( MacroPlan, feedback );
  *]
}
