Quintiq file version 2.0
#parent: TabPageGeneral/CheckBoxHasUserPreprocessingTime
Response OnChange () id:Response_TabPageGeneral_CheckBoxHasUserPreprocessingTime_OnChange
{
  #keys: '[110880.4.1861330337]'
  Body:
  [*
    // Enable / disable components
    
    Dialog.EnableDisableComponent( CheckBoxBatchEditDuration.Visible() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnChange'
}
