Quintiq file version 2.0
#parent: #root
Method SetLabelInputLotSize () id:Method_DialogCreateEditPISPSpecification_SetLabelInputLotSize
{
  #keys: '[134506.0.52710229]'
  Body:
  [*
    // Set labels lot size for different uom selection.
    
    uom := guard( SelectionUnitOfMeasurement.Data().Name(), MacroPlan.DefaultUnitOfMeasure().Name() );
    LabelInputLotSize.Text( Translations::MP_Designer_DialogCreateEditPISPSpecification_SetLabelInputLotSize( uom ) );
  *]
}
