Quintiq file version 2.0
#parent: GroupPanelSecondaryCapacity/CheckBoxSecondaryCapacity
Response OnChange () id:Response_GroupPanelSecondaryCapacity_CheckBoxSecondaryCapacity_OnChange
{
  #keys: '[124504.0.321343905]'
  Body:
  [*
    // Enable disable the panel secondary capacity based on current check
    Dialog.EnableDisableGroupPanelSecondaryPanel();
    Dialog.SetDefaultSecondaryUOM();
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnChange'
}
