Quintiq file version 2.0
Component PanelSafetyStockLabelTrackStatus
{
  #keys: '[142950.2.384468584]'
  BaseType: 'WebPanel'
  Children:
  [
    Component LabelIsRunningMEIO
    {
      #keys: '[142950.2.384468634]'
      BaseType: 'WebLabel'
      Properties:
      [
        DataBinding: 'ApplicationMacroPlanner.DataHolderMacroPlanner.Data.MEIO_Parameters.IsRunning'
        Taborder: 0
        Visible: false
      ]
    }
    Component LabelRunningSingleEchelon id:LabelRunningSingleEchelon_384
    {
      #keys: '[142950.2.384468660]'
      BaseType: 'WebLabel'
      Properties:
      [
        DataBinding: 'ApplicationMacroPlanner.DataHolderMacroPlanner.Data.IsSingleEchelonRunning'
        Taborder: 1
        Text: 'false'
        Visible: false
      ]
    }
  ]
  Properties:
  [
    Taborder: 2
  ]
}
