Quintiq file version 2.0
#parent: PanelSafetyStockLabelTrackStatus/LabelIsRunningMEIO
Response OnTextChanged () id:Response_ActionBarGroupSafetyStock_LabelIsRunningMEIO_OnTextChanged
{
  #keys: '[142950.2.384468633]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebLabel_OnTextChanged'
  GroupServerCalls: true
  QuillAction
  {
    Body:
    [*
      //Set image of GenerateSafetyStockButton
      ApplicationMacroPlanner.SetGenerateSafetyStockDisplayButton( [Boolean]this.Text() );
    *]
  }
}
