Quintiq file version 2.0
#parent: abgDevelopTechnical/ButtonProfiler
Response OnClick () id:Response_abgDevelopTechnical_ButtonProfiler_OnClick
{
  #keys: '[146448.0.218218440]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebButton_OnClick'
  QuillAction
  {
    Body:
    [*
      // Open web profiler
      ApplicationMacroPlanner.OpenForm( 'frmProfiler', 'popout' );
    *]
    GroupServerCalls: false
  }
}
