Quintiq file version 2.0
Component PanelMaximumDuration
{
  #keys: '[146302.1.856875048]'
  BaseType: 'WebPanel'
  Children:
  [
    #child: PanelDurationSelectorMax
    #child: PanelLabelIndicatorMaxQty
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    ShowActionLink: false
    Taborder: 6
  ]
}
