Quintiq file version 2.0
#parent: PanelGeneral/DropDownListUnit
Response OnUserSelectionChanged (
  Unit selection
) id:Response_PanelGeneral_DropDownListUnit_OnUserSelectionChanged
{
  #keys: '[139394.0.1573961770]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnUserSelectionChanged'
  QuillAction
  {
    Body:
    [*
      // Enable disable components
      Form.OnUserUpdateUI( selection );
      Form.SetLabels( DropDownListUnit.Data().UnitOfMeasure_MP() );
      Form.UpdateEditorID( selection );
    *]
    GroupServerCalls: false
  }
}
