Quintiq file version 2.0
#parent: PanelGroupLotSize/EditFieldUserLotSize_715
Response OnInputIdle () id:Response_PanelGroupLotSize_EditFieldUserLotSize_OnInputIdle
{
  #keys: '[139394.0.1596241539]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebEditField_OnInputIdle'
  QuillAction
  {
    Body:
    [*
      // User update UI
      // Ideally would like to user OnUserChanged
      // but it doesn't refresh until we click on the dialog to focus it
      Form.OnUserUpdateUI( DropDownListUnit.Data() );
    *]
    GroupServerCalls: false
  }
}
