Quintiq file version 2.0
Component PanelUOMBatch
{
  #keys: '[135040.0.267994560]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DropDownListUOM
    {
      #keys: '[135040.0.267999942]'
      BaseType: 'WebDropDownList'
      Databinding: 'UnitOfMeasure_MP'
      Children:
      [
        Component DataExtractorUOM
        {
          #keys: '[135040.0.267999943]'
          BaseType: 'WebDataExtractor'
          Properties:
          [
            DataType: 'MacroPlan'
            Source: 'MacroPlan'
            Taborder: 0
            Transformation: 'UnitOfMeasure_MP'
          ]
        }
      ]
      Properties:
      [
        DisplayField: 'Name'
        Taborder: 2
      ]
    }
    Component CheckboxIsOverrideUOMForProduct
    {
      #keys: '[135040.0.268000159]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        Label: 'Override unit of measurement'
        Taborder: 1
        Tooltip: '<html>The unit of measurement is defined on the product.<br>Select to use a different unit of measurement for this stocking point.<html>'
      ]
    }
    Component CheckboxBatchIsOverrideUOMForProduct
    {
      #keys: '[135040.0.268033857]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        Taborder: 0
      ]
    }
    Component ButtonWarning
    {
      #keys: '[136682.1.462017315]'
      BaseType: 'WebButton'
      Properties:
      [
        Image: 'WARNING'
        Taborder: 3
        Visible: false
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 0
  ]
}
