Quintiq file version 2.0
#parent: #root
Method OnUserUpdateUI (
  String timeunit
) id:Method_DialogCreateEditQuantityCapacity_OnUserUpdateUI
{
  #keys: '[139394.1.98472357]'
  Body:
  [*
    // Set labels
    this.SetLabels( timeunit );
    
    // Enable disable components
    this.EnableDisableComponents( CheckboxBatchEditCapacity.Checked(),
                                  CheckboxBatchEditMaxLoadPercentage.Checked(),
                                  CheckboxBatchEditNrOfUnitsOpen.Checked() /*isbatcheditcapacity*/ );
  *]
}
