Quintiq file version 2.0
#parent: PanelCurrency/DropDownListCurrency
Response OnSelectionChanged (
  Currency_MP selection
) id:Response_PanelCurrency_DropDownListCurrency_OnSelectionChanged
{
  #keys: '[136682.1.803184857]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownList_OnSelectionChanged'
  GroupServerCalls: true
  QuillAction
  {
    Body:
    [*
      // Set default uom label
      Form.SetDefaultUOMForLabel(DropDownListUnitOfMeasurement.Data(), selection);
      // Workaround: recall enable/disable logic (RFC 66023)
      Form.EnableBatchEdit();
    *]
  }
}
