Quintiq file version 2.0
Component PanelSecondaryCapacity
{
  #keys: '[139394.1.45217208]'
  BaseType: 'WebPanel'
  Children:
  [
    Component DropDownListSecondaryUOM
    {
      #keys: '[139394.1.45217257]'
      BaseType: 'WebDropDownList'
      Databinding: 'UnitOfMeasure_MP'
      Children:
      [
        Component DataExtractorSecondaryUOM
        {
          #keys: '[139394.1.45217259]'
          BaseType: 'WebDataExtractor'
          Properties:
          [
            DataType: 'MacroPlan'
            Source: 'MacroPlan'
            Taborder: 0
            Transformation: 'UnitOfMeasure_MP'
          ]
        }
      ]
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.SecondaryUnitOfMeasure'
        DisplayField: 'Name'
        Label: 'Unit of measurement'
        Taborder: 1
      ]
    }
    Component EditFieldSecondaryMinCapacity
    {
      #keys: '[139394.1.45264624]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.SecondaryMinimumCapacity'
        Mask: 'POSNORMALREAL'
        Taborder: 2
      ]
    }
    Component EditFieldSecondaryMaxCapacity
    {
      #keys: '[139394.1.45262504]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.SecondaryMaximumCapacity'
        Mask: 'POSNORMALREAL'
        Taborder: 3
      ]
    }
    Component EditFieldSecondaryLotSize
    {
      #keys: '[139394.1.45264673]'
      BaseType: 'WebEditField'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.SecondaryLotSize'
        Mask: 'POSNORMALREAL'
        Taborder: 4
        Tooltip: '<html>Trips are broken down into multiples of the lot size. <br>The quantity used for capacity calculation is rounded up to the next multiple of the lot size. <br>For example, for a lot size of 25, moving 60 tons consumes 75 tons of capacity or the equivalent of 3 trips.</html>'
      ]
    }
    Component CheckboxHasSecondaryCapacity
    {
      #keys: '[139394.1.45286610]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        CheckboxType: 'toggle'
        DataBinding: 'DataHolderDialogData.Data.HasSecondaryCapacity'
        Label: 'Has secondary capacity'
        ShowPadding: false
        Taborder: 0
        Tooltip: 'Allows the definition of a secondary capacity constraint with a different unit of measurement on the transportation resource. E.g. Constraint by volume and weight.'
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Taborder: 1
    Title: 'Secondary Capacity'
  ]
}
