Quintiq file version 2.0
#parent: #root
Method OnUserUpdateUI (
  String timeunit,
  UnitOfMeasure_MP secondaryuom
) id:Method_DialogCreateEditTransportCapacity_OnUserUpdateUI
{
  #keys: '[139394.1.45300339]'
  Body:
  [*
    // Set labels
    this.SetLabels( timeunit, secondaryuom );
    
    // Enable disable components
    this.EnableDisableComponents( CheckboxBatchEditCapacity.Checked() /*isbatcheditcapacity*/, 
                                  CheckboxBatchEditLotSize.Checked() /*isbatcheditlotsize*/, 
                                  CheckboxBatchEditSecondaryCapacity.Checked() /*isbatcheditsecondarycapacity*/, 
                                  CheckboxHasSecondaryCapacity.Checked() );
  *]
}
