Quintiq file version 2.0
#parent: PanelCapacity_424/DropDownStringListTimeUnit
Response OnUserSelectionChanged () id:Response_PanelCapacity_424_DropDownStringListTimeUnit_OnUserSelectionChanged
{
  #keys: '[139394.1.45305631]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDropDownStringList_OnUserSelectionChanged'
  QuillAction
  {
    Body:
    [*
      // Update UI
      Form.OnUserUpdateUI( selection,
                           DropDownListSecondaryUOM.Data() );
    *]
    GroupServerCalls: false
  }
}
