Quintiq file version 2.0
#parent: PanelSecondaryCapacity/CheckboxHasSecondaryCapacity
Response OnUserChanged () id:Response_PanelSecondaryCapacity_CheckboxHasSecondaryCapacity_OnUserChanged
{
  #keys: '[139394.1.45306011]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebCheckbox_OnUserChanged'
  QuillAction
  {
    Body:
    [*
      // Update UI
      Form.OnUserUpdateUI( DropDownStringListTimeUnit.Text(),
                           DropDownListSecondaryUOM.Data() );
    *]
    GroupServerCalls: false
  }
}
