Quintiq file version 2.0
Component PanelCapacity
{
  #keys: '[135040.0.213302442]'
  BaseType: 'WebPanel'
  Children:
  [
    Component RadioButtonGroupUsingOutputForCapacity
    {
      #keys: '[135040.0.218405683]'
      BaseType: 'WebRadioButtonGroup'
      Properties:
      [
        BoundValue: 'out'
        ButtonLabels: 'Input quantity;Output quantity'
        ButtonValues: 'in;out'
        DataBinding: 'DataHolderDialogData.Data.QuantityToProcess'
        Taborder: 0
        Title: 'Capacity usage'
        Tooltip: '<html>Input quantity: The total quantity of incoming products is used to calculate the capacity usage and costs for this unit<br>Output quantity: The total quantity of outgoing products is used to calculate the capacity usage and costs for this unit<html>'
      ]
    }
    #child: PanelCapacitySmoothing
    #child: PanelCheckboxIsPlannedInfinite
    Component CheckboxIsPlannedInfinite
    {
      #keys: '[135040.0.219441361]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.IsPlannedInfinite'
        Label: 'Is planned infinite'
        ShowPadding: false
        Taborder: 1
        Tooltip: 'Check to override the capacity type and (temporarily) plan this unit as infinite'
      ]
    }
  ]
  Properties:
  [
    Taborder: 3
    Title: 'Capacity'
  ]
}
