Quintiq file version 2.0
Component PanelCheckboxHasCapacitySmoothing
{
  #keys: '[135040.0.219472193]'
  BaseType: 'WebPanel'
  Children:
  [
    Component CheckBoxHasCapacitySmoothing
    {
      #keys: '[135040.0.219472194]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        DataBinding: 'DataHolderDialogData.Data.HasCapacitySmoothing'
        Label: 'Use capacity smoothing'
        ShowPadding: false
        Taborder: 0
        Tooltip: 'When checked, changes in capacity usage for subsequent periods will not exceed the Delta value'
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 0
  ]
}
